\documentclass[10pt, draftclsnofoot,onecolumn, compsoc]{IEEEtran}

\def\changemargin#1#2{\list{}{\rightmargin#2\leftmargin#1}\item[]}
\let\endchangemargin=\endlist

\usepackage{booktabs}
\usepackage{longtable}
\usepackage{hyperref}
\usepackage{framed}
\usepackage{textcomp}
\usepackage{todonotes}
\usepackage{caption}
\usepackage{pgfgantt}
\usepackage{setspace}
\linespread{1}

\providecommand{\tightlist}{%
  \setlength{\itemsep}{0pt}\setlength{\parskip}{0pt}}

  \title{Appendix 3: Code Review Changes}

\begin{document}
\maketitle

\input{review-app.tex}
\input{review-server.tex}

\pagebreak
\input{review-collar.tex}

\end{document}
